How to determine by appearance whether a vagina is narrow or wide
Veronica Larsson

© Veronica Larsson, 2025

ISBN 978-5-0067-9827-4

Created with Ridero smart publishing system

How to determine by appearance whether a vagina is narrow or wide

Determining the shape and size of the vagina based on the appearance of a woman

It is possible to determine the approximate size of the vagina, taking into account some features of its appearance.:

1. The shape of the lips and the size of the mouth can determine the depth and width of the vagina. So, a large mouth and lips can be a sign of a wide and deep vagina, and vice versa. If the lips protrude, the vagina will be very flexible and elastic, liberally releasing a large amount of natural lubricant.

2. The amount of pubic hair corresponds to the thickness of the eyebrows. The large width of the vagina is indicated by the wide location of the eyebrows. Long, densely growing eyebrows can be a sign of the health and strength of the vagina.

3. Small teeth indicate a narrow and unyielding vagina.

4. A small and flattened nose is a wide and relatively shallow vagina, while a long one is a rather deep tube – shaped vagina.

5. A well – defined chin and powerful jaws are a sign of an unyielding and strong vagina.

6. Dimples on cheeks tell about a small and shallow, but elastic vagina.

7. Bug-eyed or nearsighted women are born with a small vagina. If the eyes are set deep, the vagina is deep. Moist and glowing eyes are a sign of a large release of natural lubricant, while dry eyes, on the contrary, release lubricant in small quantities.

8. Most often, according to the shapes of the recesses of the auricles, it is possible to draw appropriate conclusions about the shape of the vagina. If the recess is large, the vagina is strong and muscular.

9. The thumbs, which have wide upper and tight lower parts, respectively show the width of the vagina at the entrance and inside. Small fingers – the vagina is narrow and small.

Women who practice oriental dancing have a narrow vagina!!!

How does the length of the vagina change over time

Over time, depending on the external conditions, a woman’s vagina also changes. For example, in women who have given birth or in women who have had an abortion, the uterus descends, which leads to a decrease in the length of the vagina by an average of 30—40 mm. If injuries were sustained during childbirth, then you should consult a doctor who will select the appropriate treatment methods.

A similar effect can occur in women who have not had sex for a very long time, which causes muscle atrophy, affecting the width of the vagina. In such cases, kegel exercises can help bring organs to a healthy state.

If a woman has a permanent sexual partner, the walls of the vagina gradually stretch and adapt to him, adapt to the size of his penis. Different forms of vaginas, with constant sexual contact with the same partner, can take any shape, adapting.

Конец ознакомительного фрагмента.

Текст предоставлен ООО «Литрес».

Прочитайте эту книгу целиком, купив полную легальную версию на Литрес.

Безопасно оплатить книгу можно банковской картой Visa, MasterCard, Maestro, со счета мобильного телефона, с платежного терминала, в салоне МТС или Связной, через PayPal, WebMoney, Яндекс.Деньги, QIWI Кошелек, бонусными картами или другим удобным Вам способом.