Energiekosten senken

Kapitel 1: Rechtliche Hinweise & Impressum

Kapitel 2: Über den Autor

Kapitel 3: Einführung

Kapitel 4: Ermittlung der aktuellen Kosten

Kapitel 5: Analyse der Kosteneinsparungen

Kapitel 6: Erste Schritte durch Ermitteln der größten Anforderungen

Kapitel 7: Klein anfangen und viel sparen

Kapitel 8: Ihre Fenster Einsparungen

Kapitel 9: Der Vorteil des Kamins

Kapitel 10: Energie sparende Gewohnheiten zur Entwicklung

Kapitel 11: Der Thermostat

Kapitel 12: Außerhalb des Hauses – Landschaftsgestaltung für energetische Vorteile

Kapitel 13: Alternative Energiequellen

Kapitel 14: Das Energie effiziente neue Zuhause

Kapitel 15: Fazit

Kapitel 1: Rechtliche Hinweise & Impressum

Dieses Werk ist durch das Urheberrecht geschützt. Zuwiderhandlungen werden straf- und zivilrechtlich verfolgt. Außer zum Eigengebrauch ist ohne schriftliche Genehmigung des Autors jegliche – auch auszugsweise – Vervielfältigung und Verbreitung nicht gestattet, sei es

in gedruckter Form,

durch fotomechanische Verfahren,

auf Bild- und Tonträgern,

auf Datenträgern aller Art.

Untersagt ist ebenfalls das elektronische Speichern, insbesondere in Datenbanken, zum Zwecke des Verfügbar machen für die Öffentlichkeit, sei es zum individuellen Abruf, zur Wiedergabe auf Bildschirmen oder zum Ausdruck. Dies schließt auch Pod-Cast, Video Stream usw. ein.

Das Übersetzen in andere Sprachen ist ebenfalls vorbehalten.

Sämtliche Angaben und Anschriften wurden sorgfältig und nach bestem Wissen und Gewissen ermittelt. Trotzdem kann vom Autor und Verlag keine Haftung übernommen werden, da (Wirtschaft) Daten in dieser schnelllebigen Zeit ständig Veränderungen ausgesetzt sind.

“Energiekosten senken – Reduzieren Sie Ihre Energiekosten!“, 1. Auflage 2019 © Copyright/Impressum:

André Sternberg

In der Seilmecke 20

57392 Schmallenberg

E-Mail: andresternberg21@gmail.com

Empfehlung:

Digital Money Maker Club: Arbeite weniger und verdiene mehr als je zuvor!

Kapitel 2: Über den Autor

André Sternberg ist ein in Deutschland lebender Unternehmer, der es liebt, Wissen zu teilen und anderen beim Thema (Energiekosten senken) zu helfen.

André ist eine leidenschaftliche Person, die die Extra Meile gehen und überbieten wird.

André´s Worte der Weisheit:

“Ich glaube, dass Wissen Macht ist. Jeder sollte sich selbst und/oder sein Geschäft verbessern, egal in welchem Stadium seines Lebens. Ob es darum geht, eine bessere Denkweise zu entwickeln oder den Profit zu steigern. Vorwärts zu bewegen ist der Schlüssel.“

Hier finden Sie weiter Artikel von André Sternberg (frischer Content für Ihre Webseiten & Blogs):

http://www.contentworld.com/authors/profile/17570/

Bücher von André finden Sie hier:

André´s Bücher

Kapitel 3: Einführung

Egal, ob Sie nur ein paar Euro von ihrer Gasrechnung fallen lassen möchten oder nach einer besseren Möglichkeit suchen, Ihr Haus insgesamt zu betanken. Wenn Sie nur ein paar Dinge tun, kann dies einen großen Unterschied in Ihrem Haus bewirken.

Warum sich mit der Kosteneffizienz beschäftigen? Sie können sich die Rechnungen leisten, warum also die Mühe machen? Viele Menschen werden schockiert sein zu erfahren, dass sie bis zu 25% oder mehr Energie in Ihrem Zuhause verlieren können, ohne dass dies erforderlich ist. Sie könnten buchstäblich Ihr Geld in den Abfluss spülen.

Die gute Nachricht ist, dass die Energieeffizienz Ihres Hauses nicht übermäßig schwierig sein muss. Es muss auch nicht teuer sein. Es gibt einige Änderungen, die einen anständigen Betrag kosten, um sie in einem Heim umzusetzen. Dies sind normalerweise Dinge, die berücksichtigt werden müssen, wenn Sie viel Geld sparen möchten.

Wie Sie in diesem eBook sehen werden, gibt es eine Menge Dinge, die Sie tun können, um die Fähigkeit Ihres Hauses zu verbessern, Energie aus fast allen Bereichen, die Sie sich vorstellen können, klüger zu nutzen. In unserem ersten Kapitel müssen wir uns jedoch die Zeit nehmen, um wirklich zu analysieren, ob es sich wirklich lohnt, die Änderung tatsächlich vorzunehmen.

Es gibt einige Produkte und einige Unternehmen, die versprechen, dass Sie viel Geld sparen und Sie viel investieren, um nichts zu sparen.

Das Beste für jeden, der die Fähigkeit seines Hauses, Energie sinnvoll zu nutzen, zu verbessern, ist es, genau zu prüfen, was das Produkt oder der Bedarf ist, wie es verwendet wird. Die Kosten des Produkts und die Kosten der Installation wenn es tatsächlich das Potenzial hat, diese Mittel durch Energieeinsparungen aufzufüllen. Einige werden nicht andere werden es tun.

In diesem eBook erfahren Sie, was Sie sofort tun können, um die Energieeffizienz Ihres Hauses zu verbessern. Sie werden auch verschiedene Möglichkeiten kennen lernen, um bei alltäglichen Bedürfnissen, die Sie haben, Geld zu sparen. Sie sparen Geld und leben in einem effizienteren und umweltfreundlichen Zuhause.

Kapitel 4: Ermittlung der aktuellen Kosten

Eines der ersten Ginge, die Sie tun sollten, wenn Sie Ihre Fähigkeit betrachten, Ihr zuhause Kosten effizienter zu gestalten, ist es, genau zu wissen, was Sie gerade bezahlen.

Indem Sie sich die Zeit nehmen, um festzustellen, was Sie derzeit für Energie ausgeben, können Sie besser feststellen, mit welchen Bereichen Sie das Energiesparpotenzial haben. In jedem Gebiet des Landes gibt es unterschiedliche Tarife, unterschiedliche Kooperationen und eine große Auswahl an unterschiedlichen Kraftstoffarten.

Es liegt an ihnen, anhand Ihrer monatlichen Rechnung Zahlungen herauszufinden, was Sie bezahlen. Schauen Sie sich diese Zahlungen an und betrachten Sie zwei Dinge.

Was ist der Betrag, den Sie pro Einheit für diese Energiequelle bezahlen?

Welche Menge dieses Kraftstoffs verwenden Sie pro Monat in Einheiten?

Ihr Ziel ist es, zu bemerken, wie Sie diese ändern können.

Können Sie Stückkosten senken?

Der erste Weg, um festzustellen, ob Sie Ihre Kosten mit ihrem Energieverbrauch senken können, besteht darin, zu ermitteln, ob Sie den kostengünstigsten Anbieter für diese Art von Energie haben.

In vielen Regionen des Landes gibt es mehrere Anbieter für jede Art von Kraftstoff, den Sie benötigen. Sie haben beispielsweise die Wahl, in welchem Gasunternehmen Sie tätig sind oder in welchem Elektrizitätsunternehmen Sie tätig sind. Wenn dies der Fall ist, sollten Sie festlegen, welcher der niedrigsten Sätze pro verbrauchter Energieeinheit zur Verfügung steht.

Um herauszufinden, ob Sie eine Option in diesem Service haben, wenden Sie sich einfach an Ihre lokale Regierung. Sie können leicht feststellen, welche Anbieter verfügbar sind und Ihnen Kontaktinformationen zur Verfügung stellen.

Dann rufen Sie jeden Anbieter an und fragen Sie ihn, ob er tatsächlich zu ihnen nach Hause kommt. Wenn ja, fragen Sie nach den jeweiligen Tarifen pro Einheit sowie den eventuell anfallenden Überweisung- oder Kontoführungsgebühren. Tun Sie dies für alle Anbieter in Ihrer Nähe, bis Sie die günstigste Option finden.

Auf diese Weise können Sie sofort Geld sparen, ohne sich Gedanken darüber zu machen, dass Sie nur wenige Minuten Ihrer Zeit investieren.

Können Sie die Anzahl der Einheiten senken?

Der nächste Schritt in diesem Prozess besteht darin, zu bestimmen ob Sie die Anzahl der von Ihrer Energiequelle verwendeten Einheiten verringern können. Nun, die einfachste Möglichkeit, dies zu tun, besteht darin, einfach mehr Strom oder Kraftstoff für zu Hause abzuschalten.

Eine Sache, die die Leute nicht erkennen, ist, wie wichtig es ist, dass Sie die Geräte und andere Werkzeuge für Ihr Zuhause ausschalten und entfernen.

Auf den nächsten Seiten dieses E-Buchs erfahren Sie nicht nur, wie Sie die Effizienz Ihres Hauses verbessern, sondern auch, wie Sie ganz einfach weniger Energie verbrauchen. Wenn Sie dies tun, sind Sie in der Lage, niedrigere Kosten zu finden.

Beginnen Sie, indem Sie jetzt ein paar Minuten investieren. Stehen Sie auf und gehen von Raum zu Raum in Ihrem Zuhause. Schalten Sie das Licht, den Lüfter und das Gerät aus. Vergessen Sie nicht, die Einheiten herauszuziehen, bei denen die LED-Anzeigen eingeschaltet sind, auch wenn sie ausgeschaltet sind. Diese Einheiten können Ihnen viel Geld sparen. Gehen Sie geradeaus, sehen Sie, wie viel Sie bereits sparen können.

Kapitel 5: Analyse der Kosteneinsparungen

Bevor wir mit Methoden, mit denen Sie die Anzahl der Einheiten, die Sie pro Monat für ihren Kraftstoff ausgeben, senken können, Geld sparen, muss ich Ihnen die Vorteile von Energieeinsparungen durch intelligente Investitionen zeigen.

Da sich die Welt in einer Kraftstoffkrise befindet und die Kosten für Gas und andere Energieträger weiter steigen, gibt es nicht ganz so nette Leute, die Produkte fördern, die alles andere als ein Weg sind, um Geld zu sparen. Diese Produkte funktionieren möglicherweise aber wahrscheinlich nicht.

Der Trick ist, dass Sie vor dem kauf wissen müssen, ob sie Kosten effektiv sind oder eine Verschwendung Ihres hart verdienten Geldes sind.

Ich kann Ihnen mit ein paar guten Tipps zum Kauf von Gegenständen helfen, die Ihnen die Möglichkeit zur Einsparung von Energie beim Energieverbrauch in Ihrem Haus präsentiert werden. Nehmen Sie sich etwas Zeit, um darüber nachzudenken, in was Sie investieren, bevor Sie dies tun. Dies allein kann Ihnen Geld sparen.

Tipps zur Analyse des Nutzens

Nehmen Sie sich diese Tipps zu Herzen:

Was verspricht das Produkt für Sie? Jedes Produkt, das erstaunliche Ergebnisse verspricht, liefert sie wahrscheinlich nicht. Wenn es da draußen ein Wunder Produkt gäbe, hätten wir nicht alle jetzt?

Was kostet dieses Produkt überhaupt? Wie viel kostet es Sie, dieses Produkt zu kaufen, zu installieren und dann zu verwenden?

Haben diese Kosten tatsächlich Einsparungen für Sie in den ersten Tagen der Nutzung? Mit anderen Worten, es sollte Ihnen sofort helfen, Geld für Ihren Energiebedarf zu sparen.

Wie lange dauert es schließlich, bis Sie den Unterschied in den Produktkosten ausmachen und wie viel Geld haben Sie investiert?

Wenn Sie Ihre Kosten nicht schnell genug zurückerhalten können, ist dies möglicherweise auch nicht die richtige Wahl für Ihre Bedürfnisse. Wenn Sie diese Dinge in Betracht ziehen, werden Sie den wahren Nutzen eines vermeintlichen Energie spar Geräts, das sich auf dem Markt befindet, besser verstehen können. Nun gibt es sicherlich auch die Dinge, die tatsächlich funktionieren. Aber Sie müssen sie zuerst finden.

Wissen, bevor Sie kaufen

Es gibt einige Dinge, die Sie kennen sollten, bevor Sie in diese Energie spar Produkte investieren. Nun, wohlgemerkt, wenn Sie von einer 10-Euro-Investition sprechen, ist diese Forschung nicht erforderlich. Wenn Sie jedoch über den Austausch oder die Änderung eines der wichtigsten Systeme zur Energieerzeugung in Ihrem Haushalt wie Ihrem Ofen nachdenken, lohnt es sich, auf die Details zu achten.

Zu erfahren ist, wer das Unternehmen ist, das dieses Produkt tatsächlich anbietet. Wer vermarktet dieses Produkt beispielsweise an Sie? Sie können auch nach Bewertungen des Produkts suchen, indem Sie Ihre bevorzugte Suchmaschine und den Namen des Produkts gefolgt von der Wort Bewertung verwenden. Wenn Sie dies tun, finden Sie möglicherweise mehrere verschiedene Websites, die alle einen anderen Blick darauf werfen, was dieses Produkt für Sie tun kann oder nicht tun kann.

Nehmen Sie sich die Zeit, um festzustellen, ob es gute oder schlechte Punkte für dieses Produkt gibt. Es ist auch von Vorteil, sich etwas Zeit zu nehmen, um zu erfahren, wie der Hersteller des Produkts seine Behauptung untermauert. Wenn Sie feststellen, dass das Produkt nicht so effektiv arbeitet, wie es versprochen hat, können Sie es ihnen zurückschicken? Wenn ja, sollten Sie vor dem Kauf wissen, wo Sie es zurückgeben können, um Ihr Geld zurückzubekommen.

Diese Dinge zu tun ist fast ein Muss, wenn Sie bei einem Unternehmen einkaufen, von dem Sie in der Vergangenheit nichts gehört haben. Darüber hinaus müssen Sie sich selbst schützen.

Ist es die Kosten wert?

Es gibt viele Fallen, die wirklich jedes Potenzial einschränken können, das Sie haben, um etwas von einem Produkt zu gewinnen. Das Endergebnis ist jedoch, dass das Produkt, das Sie kaufen, um Geld zu sparen, tatsächlich dazu in der Lage sein muss.

Um dies zu erreichen, müssen die Kosten des Produkts schnell durch das Produkt ausgeglichen werden können, wodurch Sie Geld sparen.

Sie sollten sich auch etwas Zeit nehmen, um herauszufinden, ob dieses Produkt Ihren Bedürfnissen entspricht. Wenn Sie für einen Haushalt, den Sie nicht verwenden, in einen neuen Ofen im Wert von 2000 Euro investieren, kann dies für Sie nicht besonders vorteilhaft sein. Aber wenn Sie diesen Ofen jeden Tag benutzen, kann dieses Geld zehnmal schneller zu Ihnen zurückkommen, wenn sich das Produkt natürlich lohnt.

Obwohl ich hier einige negative Dinge zu Produkten auf dem Markt gesagt habe, die für die Energieeffizienz Ihrer Wohnung möglicherweise nicht von Vorteil sind, ist es wichtig zu wissen, dass es viele großartige Unternehmen und Dienstleistungen gibt, die dazu in der Lage sind. Sie bieten Service von höchster Qualität und senken Ihre Kraftstoffkosten.

Wenn Sie darüber nachdenken, wären keine Sonnenkollektoren in der Nähe, wenn nicht jemand daran gedacht hätte, die Kraft der Sonne zu nutzen, um uns zu heizen.

Sie würden auch nicht genug von den anderen Dingen haben, die wir jeden Tag verwenden, wenn nicht jemand gedacht hätte, das dies eine großartige Idee wäre und es dann möglich gemacht hat.

Daher ist es sinnvoll, sicherzustellen, dass Sie sich die Zeit nehmen, darüber nachzudenken, was das Produkt ist und was es verspricht. Zwar gibt es Betrügereien auf dem Markt, aber es gibt auch eine Reihe von vorteilhaften Produkten auf dem Markt, mit denen Sie den Energiebedarf Ihres Hauses besser einsparen können.