Ginas Amore 5

Tutti i diritti riservati.

Gli usi non autorizzati, come la riproduzione, la distribuzione, la memorizzazione e la trasmissione, possono essere oggetto di procedimenti civili o penali.

Tutti i diritti riservati dall'autore.

Copyright originale © 2018, di Gina Weiß.

Prefazione :

Il mio nome è Gina Weiß. Sono nato nel 1992 a Schweinfurt, in Germania. Fin dall'infanzia ho scritto storie di ogni genere. Più vecchio avevo, più forte era il desiderio di scrivere storie erotiche. E ora, sì.

Non seguo le convenzioni. Processi fissi o idee comuni. A volte scrivo dal punto di vista della donna, a volte dal punto di vista dell'uomo. Perché le mie storie sono destinate a piacere ad entrambi i sessi.

Spero di rendere i miei lettori felici con le mie "opere". E per ispirare atti erotici.

Il tuo Gina

Parte 5

Siamo due single busty che non mancano di esperimenti e sono sempre alla ricerca di divertimento e avventura. Sonja ha 32 anni, ha lunghi capelli neri, figura slanciata con rigonfiamento, non appeso 80E e fondo antiscivolo.

Io, Karolin, ho 28 anni, hanno lunghi capelli rossi, una figura sportiva con rotondo, solido 80D e ben formata fondo. Quando andiamo fuori, ci piace mostrare quello che abbiamo e sono spesso chiesto circa i nostri seni grandi.

Siamo a pochi anni di distanza e la ricerca medica ha compiuto alcuni progressi. L'ultimo sviluppo è un dispositivo con il quale il ginecologo può determinare la capacità orgasmica delle donne. Funziona molto facilmente, il medico spinge un sensore sulla vagina, che dopo pochi secondi mostra la capacità di orgasmo su una scala da 0 (non in grado) a 10 (assolutamente in grado).

Parallelamente al sensore, l'industria farmaceutica ha sviluppato due principi attivi che influenzano la capacità orgasmica, uno che ha un effetto rinforzante, chiamato anche G-crema, e uno che provoca una ridotta capacità, o F-crema.

Soprattutto le donne con problemi di orgasmo si imbattono nelle loro pratiche ginecologiche, si sono sottoposti a test e ottenere il farmaco con l'effetto di rafforzamento. Lo stress sul lavoro e nella vita quotidiana non è esattamente favorevole a una corretta pacificazione a letto, che è evidente negli uomini e nelle donne. Quello che 25 anni fa era Viagra per gli uomini è ora G-crema per le donne.

Sonja ed io non abbiamo mai avuto problemi con i nostri orgasmi, al contrario. Una sera ci siede entrambi comodamente insieme con un cocktail e chiacchierare, parlare del nuovo dispositivo sensore. Se ci lasciamo "misurare" per divertimento.

Sonja mi sorride e mi dice: "Oh uomo, sarà divertente. Poor Doc di solito si occupa solo di questi polli frigidi e poi ci arriveremo, soprattutto voi". Rido ad alta voce e la gommo, "Ricordate il ragazzo con la coda di martello? "Sì, beh, sicuramente hai urlato le tue orecchie a quel ragazzo quando sei venuto su di lui. Oh, Dio, aveva un mostro nei suoi pantaloni".

Non appena detto, il giorno dopo ci siamo recati al centro specializzato in medicina sessuale, dove oltre al ginecologo ci sono altre pratiche che si occupano dell'argomento. Esiste anche un laboratorio di ricerca dove vengono testati nuovi farmaci. Non c'è bisogno di aspettare a lungo e Sonja è la prima a sedersi sulla sedia.

Il doc guarda la sua figa nuda e introduce il sensore. Sonja trema un po', perché il dispositivo è molto freddo "Non si può riscaldare un po' prima", dice, "No, non è possibile, questo falsificherebbe i risultati" il medico reagisce. Poco tempo dopo, il sensore emette un segnale acustico e sulla bilancia lampeggia la scritta NINE. Quando vedo il numero, mi basta spingere fuori "you animal" e il doc lentamente comincia a arrossire.

Ora è il mio turno, mi siedo sulla sedia, stendere le gambe e metterle nel supporto. Piccole gocce di sudore sulla fronte del medico mentre guarda la mia figa rasata e Sonja comincia a ridere. Cerco per me stesso e vedere le mie labbra già abbastanza bagnato lucido. "Oops" dico "non avevo notato che ero così eccitato per il test".

Il doc mette il dispositivo su e lo preme tra le labbra, sento anche il freddo del sensore e la misurazione inizia. Si tratta di una sorta di piccola scossa elettrica che scatta attraverso la mia vagina fino a quando il dispositivo emette un segnale acustico e una TEN fat-clink appare sulla scala.

"Tu semini" dice Sonja e mi sorride "che era chiaro ancora una volta che hai 10 e ho solo 9" Il medico cerca di dire qualcosa e solo balbettii "Questi sono entrambi valori molto buoni, non ho mai avuto risultati

Impressum

Texte © Copyright by
Gina Weiß Postfach 42 97634 Mellrichstadt padigio@gmx.de

Bildmaterialien © Copyright by
Gina Weiß

Alle Rechte vorbehalten.

http://www.neobooks.com/ebooks/gina-weiss-ginas-amore-5-ebook-neobooks-AW46V8-qPC7D7AS2s2wd