Ginas Amour 5

Tous droits réservés.

Les utilisations non autorisées, telles que la reproduction, la distribution, le stockage et la transmission, peuvent faire l'objet de poursuites civiles ou pénales.

Tous droits réservés par l'auteur.

Original copyright © 2018, par Gina Weiß.

Avant-propos :

Je m'appelle Gina Weiß. Je suis né en 1992 à Schweinfurt, en Allemagne. Depuis mon enfance, j'ai écrit des histoires de toutes sortes. Plus je vieillissais, plus le désir d'écrire des histoires érotiques devenait fort. Et maintenant, oui.

Je ne suis pas les conventions. Processus fixes ou idées communes. Parfois, j'écris du point de vue d'une femme, parfois du point de vue d'un homme. Parce que mes histoires sont faites pour plaire aux deux sexes.

J'espère rendre mes lecteurs heureux avec mes "œuvres". Et pour inspirer des actes érotiques.

Votre Gina

Partie 5

Nous sommes deux célibataires busty qui ne manquent aucune expérience et sont toujours à la recherche d'amusement et d'aventure. Sonja a 32 ans, a de longs cheveux noirs, une silhouette élancée, une silhouette élancée, non suspendue 80E et un fond antidérapant.

Moi, Karolin, 28 ans, j'ai de longs cheveux roux, une silhouette sportive avec un fond rond, ferme et bien formé. Quand nous sortons, nous aimons montrer ce que nous avons et on nous pose souvent des questions sur nos gros seins.

Nous sommes dans quelques années et la recherche médicale a fait des progrès. Le dernier développement est un appareil avec lequel le gynécologue peut déterminer la capacité orgasmique des femmes. Il fonctionne très facilement, le médecin pousse un capteur sur le vagin, qui après quelques secondes montre la capacité d'orgasme sur une échelle de 0 (pas capable) à 10 (absolument capable).

Parallèlement au capteur, l'industrie pharmaceutique a développé deux ingrédients actifs qui influencent la capacité orgasmique, l'un qui a un effet fortifiant, également appelé G-crème ; et l'autre qui provoque une diminution de la capacité, ou F-crème.

Ce sont surtout les femmes ayant des problèmes d'orgasme qui se heurtent aux pratiques de leurs gynécologues, se font tester et reçoivent le médicament avec l'effet fortifiant. Le stress au travail et dans la vie de tous les jours n'est pas exactement propice à une pacification adéquate au lit, ce qui est perceptible chez les hommes et les femmes. Ce qui était du Viagra pour les hommes il y a 25 ans est maintenant de la crème G pour les femmes.

Sonja et moi n'avons jamais eu de problèmes avec nos orgasmes, au contraire. Un soir, nous nous asseyons confortablement ensemble avec un cocktail et discutons, parlons du nouveau capteur. Que l'on se laisse "mesurer" pour le plaisir.

Sonja me sourit et me dit : "Oh mec, ce sera amusant. "Le pauvre Doc ne s'occupe généralement que de ces poulets frigides et nous viendrons, surtout vous." Je ris fort et je lui donne des coups de poing, "Tu te souviens du type à la queue de marteau ? "Ouais, eh bien, tu as crié à ce type quand tu es venu sur lui. Oh, mon Dieu, il avait un monstre dans son pantalon."

Le lendemain, nous sommes allés au centre spécialisé en médecine sexuelle, où, en plus du gynécologue, il y a d'autres cabinets qui s'occupent du sujet. Il y a aussi un laboratoire de recherche où de nouveaux médicaments sont testés. Nous n'avons pas à attendre longtemps et Sonja est la première à s'asseoir sur la chaise.

Le docteur regarde sa chatte nue et présente le capteur. Sonja tremble un peu, parce que l'appareil est très froid "Ne pouvez-vous pas chauffer les appareils un peu à l'avance", dit-elle, "Non, ce n'est pas possible, cela fausserait les résultats", réagit le médecin. Peu de temps après, le capteur émet un bip et un NEUF clignote sur la balance. Quand je vois le numéro, je pousse "you animal" et le doc commence à rougir lentement.

Maintenant c'est mon tour, je m'assois sur la chaise, j'écarte les jambes et je les mets dans le support. De petites gouttes de sueur se forment sur le front du médecin alors qu'il regarde ma chatte rasée et Sonja commence à rire. Je cherche par moi-même et je vois mes lèvres déjà bien mouillées et brillantes. "Oops", je dis : "Je n'avais pas remarqué que j'étais si excité par le test."

Le docteur met l'appareil et le presse entre mes lèvres, je sens aussi le froid du capteur et la mesure commence. C'est une sorte de petit choc électrique qui traverse mon vagin jusqu'à ce que l'appareil émette un bip et qu'un TEN clignotant apparaisse sur la balance.

"Le médecin essaie de dire quelque chose et ne fait que bégayer "Ce sont deux très bonnes valeurs, je n'ai jamais eu des résultats aussi élevés dans ma pratique, même dans les rapports

Impressum

Texte © Copyright by
Gina Weiß Postfach 42 97634 Mellrichstadt padigio@gmx.de

Bildmaterialien © Copyright by
Gina Weiß

Alle Rechte vorbehalten.

http://www.neobooks.com/ebooks/gina-weiss-ginas-amour-5-ebook-neobooks-AW46Ss4jPC7D7AS2s2wB