Est-il possible de guérir complètement le génotype 1b
Combien d’années vivent avec l’hépatite C
Christian Bernard

© Christian Bernard, 2018

ISBN 978-5-4493-2567-9

Created with Ridero smart publishing system

Pourtant, un tel virus est appelé «japonais», car ses pays d’origine sont le Japon, Taiwan et la Chine. Certains rapports indiquent que la patrie de ce virus est la Russie extrême-orientale…

Le génotype de l’hépatite C 1b est-il disponible? Combien d’années peut-être pour vivre avec l’hépatite? Pas étonnant qu’ils disent que l’hépatite C est un «tueur économe».

C’est dangereux non seulement parce que ses symptômes commencent à apparaître même lorsque le foie ne peut pas être guéri. Mais le danger est que l’hépatite peut être de nature différente. Le plus dangereux est le génotype de l’hépatite C 1b. L’agent responsable de la maladie est le virus à ARN, qui n’a été découvert qu’en 1989.

Par conséquent, il n’a pas été possible de trouver un vaccin approprié, car une colo de 40 ans est nécessaire à cette fin. Selon les experts, le génotype 1b est le plus stable, il ne cède donc à aucun traitement.

Aujourd’hui, toutes les études sont en cours concernant le traitement du génotype, ainsi que l’élimination de la source d’apparence. De plus, les spécialistes essaient de trouver le schéma thérapeutique le plus optimal.

La maladie est traitable. Cependant, le résultat ne sera pas toujours positif la première fois. Par conséquent, cela vaut la peine de se battre et la santé sera au plus haut niveau.

Caractéristiques de ce type d’hépatite

Pourtant, un tel virus est appelé «japonais», car ses pays d’origine sont le Japon, Taiwan et la Chine. Certains rapports indiquent que la Russie extrême-orientale est également la patrie de ce virus.

La majorité de ce virus peut infecter, les touristes peuvent visiter, qui étaient en Thaïlande. Les médecins appellent une telle infection de l’hépatite un type hémocontact. A savoir, une personne peut être infecté de telle manière que pour les autres types d’hépatite, la méthode de contact avec une personne infectée par le liquide.

De plus, vous pouvez attraper un virus si vous ne respectez pas les règles d’hygiène, au cours de la médecine de manipulation. Il peut s’agir d’inoculations et vous pouvez être infecté par le dentiste.

En outre, le virus peut facilement entrer dans le corps humain, si au cours d’une manucure ou tatouages ont des lésions cutanées. Après la défaite, le virus peut se déplacer librement sur le corps humain, sans aucun obstacle.

Pour cette raison, dans les hôpitaux et dans les salons, les outils sont traités avec un solvant spécial contre les bactéries. Il convient de noter qu’il existe également d’autres moyens de détecter un virus presque impossible à contrôler.

Cette infection peut être transmis de la mère à l’enfant, et il peut aussi se développer chez les toxicomanes, qui utilisent souvent une seule seringue.

De cette façon, vous pouvez être infecté par différents types d’hépatite C. Vous devez savoir que la source d’infection a une origine biologique liquide du patient, et rien d’autre.

Un tel virus peut être dans le sang, le lait, la mère, le sperme ou le vagin. S’il y a beaucoup de virus dans le corps, alors il peut être dans la salive. Cependant, selon de nombreuses études, la présence du virus dans la salive n’a pas été apportée.

Selon les experts, peuvent être infectés par l’hépatite et pendant les ustensiles d’usage général, des vêtements et d’autres articles ménagers.

Quelles sont les caractéristiques de l’hépatite «japonaise»?

L’hépatite C du génotype b présente de nombreuses différences, comme en témoignent les caractéristiques:

Surtout, il peut être détecté chez les personnes qui ont reçu des transfusions sanguines. Selon les statistiques, environ 80% des patients ont reçu une infection pour une raison similaire. Avec une telle infection, il n’est pas facile de traiter l’hépatite. Pour guérir ce type de maladie, il est nécessaire de suivre un long parcours thérapeutique. Dans certains cas, l’hépatite est susceptible de réapparaître.