# How the Piano Came to Be

Ellye Glover

From the dried sinews stretched across the shell of a dead tortoise to the concert-grand piano of the present day is a far flight. Yet to this primitive source, it is said, may be traced the evolution of the stringed instrument which reached its culmination in the piano. The latter has been aptly called "the household orchestra," and in tracing its origin one must go far back into the annals of the past. If we accept the Bible as history, and it is the greatest of all histories, the stringed instrument is of very ancient date. It is recorded that the ambassadors who came to the court of Saul played upon their nebels, and that David, the sweet singer of Israel, wooed the king from his sadness by singing to his harp. We must go back to the civilization of ancient Egypt, more than five hundred years before that morning nearly two thousand years ago when, it is written, the angelic choir chanted above the historic manger the glorious message, "Peace on earth, good will to men," and the morning stars sang together.

In the olden times the Greeks laid claim to everything which bespoke culture and progress. The pages of ancient history record no other one thing so persistently as "the glory that was Greece." And so they tell of the time when —

"Music, heavenly maid, was young,
And yet in ancient Greece she sung!"

It is now generally conceded, however, that it was not in Greece but in ancient Egypt that art, music, and the sciences in general were born. That the Egyptians had stringed instruments is unquestionable. Away back in the year 525 B.C. Cambyses subdued the land. He overthrew the temples in the ruins of which have been found the records of musical instruments dating from the very earliest times. But the priests who guarded the temples were slain, and every vestige of what might have helped to determine the origin of the stringed instrument, out of which, later, the piano was evolved, as well as the names of those who wrought and endeavored to construct instruments which would give forth music, was forever lost.

For lack of written authority, then, one must turn back to tradition for light upon the origin of the piano. Tradition says that Ham, or one of his sons, led the first colony into Egypt. In fact there is a legend that Noah himself once dwelt there and some historians have identified him with the great deity of the Egyptians, Osiris. To Hermes, or Mercury, the secretary of Osiris, is ascribed the invention of the first stringed instrument. The story is that Hermes was walking one day along the banks of the Nile. It was just after one of the great inundations. The Nile had overflowed its banks and the land had been submerged. But now the water had subsided, and as Hermes walked along the shore, his foot struck accidentally against the shell of a dead tortoise. Across the inside of the shell the dried sinews were tightly stretched. Hermes picked it up and touched the sinews with his fingers. He was amazed to hear the sweet tones which the picking of the strings produced. He set to work to make a musical instrument, using the shell of a tortoise for the body and placing strings across it. In substantiation of this legend we find in examining the lyre of the ancient Greeks that almost every one was ornamented with a tortoise. We find also in the records of the Hindus, the Chinese, the Persians, and the Hebrews that these people had stringed musical instruments at a very early date and that the most common among them was the lyre in its various modifications.

The famous sepulcher of Rameses III is elaborately ornamented with harps. Specimens of this instrument have been found also in excavations made in comparatively recent years. In 1823 Sir J. G. Wilkinson discovered in an old Egyptian tomb a harp which, despite the fact that three thousand years had gone by since it had been put to sleep beside its royal master, was in an excellent state of preservation. The strings were of cat-gut and were in marvelously good condition. The custom which the Egyptians had of portraying their daily life upon their city walls, their temples, and tombs has been of incalculable value to the antiquarians in search of authentic information. From the pictures which ornament these temples and tombs we have learned that the harp and the lyre were the favorite instruments of the Egyptians, and these carvings alone furnish indisputable proof of their use by these people.

But all the research which man, thus far, has been able to make has not revealed just who it was that first discovered music in a lifeless instrument. This fact will always be deeply veiled in mystery. All attempts to unravel the threads have failed. None knows yet just who they were who first

"Struck the chorded shell,
And, wondering, on their faces fell
To worship the celestial sounds.
Less than a God they thought there scarce could dwell
Within the hollow of that shell
That spoke so sweetly and so well."

Just how many strings Hermes had on his tortoise-shell instrument is a much disputed question. Some say there were but three and that they represented the three seasons – spring, summer, and winter – into which it was the custom of the Greeks to divide their year. Some authorities claim that the strings numbered four. Others say there were seven. No one knows. The Greek harp was played by picking the strings with the fingers or with a plectrum. The latter was a small piece of bone or metal, held in the fingers, with which the strings were snapped. Sometimes a short piece of wood was used to strike the strings.

A step forward in the evolution of the stringed instrument was made during the Middle Ages when the psaltery became popular. It consisted of a box with strings across it, and records for us the first attempt at a sounding board. This was followed by the dulcimer, which closely resembled it but was somewhat larger. A plectrum was used to play them both.

A very good idea of the psaltery and dulcimer may be obtained from the xylophone. This instrument has bars of wood or metal which are struck with a wooden mallet. The keyboard was invented in the eleventh century. It was applied first to an instrument called a clavier and later to the organ. The first stringed instrument to which this new device was applied was the clavicytherium, or keyed cithara. It had a box with a cover and strings of cat-gut, arranged in the form of a half triangle. It was made to sound by means of a quill plectrum attached in a rude way to the end of the keys. This was the progress the piano of today had made in the thirteenth century.

Next in order of development comes the monochord, clarichord, or clavichord, the latter being the name by which it is generally known. As it was the instrument most used during the six centuries which followed, it is worthy of close study. In shape it much resembled a small square piano without frame or legs. The strings were of brass, struck by a wedge made of the same metal which was called a tangent. It was capable of soft tones only, but they were very sweet and melancholy. The elder Bach loved this instrument. He did not take kindly to the piano which was about to supplant his beloved clavichord. One regrets that he could not have lived to have seen it perfected. In playing the music written by Bach we must remember that he wrote entirely for the clavichord. The instrument he used was, without doubt, the product of Italy, as during this time the Italians led all Europe in the arts. At a later period the clavichord was copied by the Germans and Belgians. It was used by them for centuries on account of its simple construction and low price. Mozart always carried one with him as part of his baggage when traveling. The virginal, spinet, and harpsichord followed the clavichord in rapid succession, considering that the last named instrument had been in favor for such a long time, with seemingly no attempt at improvement. All of these three instruments had strings of brass, with quill plectra attached to pieces of wood. These were called "jacks" – a name still used today in making up the action of the piano.

The virginal and spinet were almost identical with each other, but the harpsichord was larger and occasionally was built with two keyboards. There are several explanations as to why the virginal was so called. One is that it got its name from its association with hymns to the Virgin. Another is that it was thus called in honor of Elizabeth, the Virgin Queen. We may accept whichever theory best suits us, but history records that both Elizabeth and Mary of Scotland were proficient in its use and that it was the favorite instrument of Henry VIII. Items for repairs and for instruction in playing the virginal appear frequently in the royal expense book, showing conclusively that His Majesty was not unmindful of such accomplishments. Four octaves was the range of these old instruments, from the second added line below in the bass to the second added line above in the treble. There was but one string to each note, and one can well understand why a writer of that period describes the tone as "a scratch